Count

0.1 1 10 100 1000

10000

100000

1e+06

0.1 1 10 100 1000 10000 0.1 1 10 100 1000

10000

100000

1e+06

0.1 1 10 100 1000 10000

(a) 23S.M (c) 23S.E

0.1 1 10 100 1000

10000

100000

1e+06

0.1 1 10 100 1000 10000 0.1 1 10 100 1000

10000

100000

1e+06

0.1 1 10 100 1000 10000

(b) 23S.M.aa ag (d) 23S.E.aa ag Gap length