Cat 2

Cat 1

0 20 40 60 80 100 A|C B E

Performance (% correct)

Cat 3

0 20 40 60 80 100 A|C B E

Performance (% correct)

Cat 2

0 20 40 60 80 100 A|D B C

Performance (% correct)

Cat 1

0 100 200 300 400 500 600 700 0

80

Mean firing rate [Hz]

Time [ms]

C_{cer01a47} 0

80

Mean firing rate [Hz]

B_{col13a20} 0

80

Mean firing rate [Hz]

A_{col10d24}