10 12 14 16 18 20 22 24 26 28 30 32 0 250 500

10 12 14 16 18 20 22 24 26 28 30 32 0 250 500

10 12 14 16 18 20 22 24 26 28 30 32 0 250 500

10 12 14 16 18 20 22 24 26 28 30 32 0 250 500

Intensity (mAU)

1 3 5 6

2

2 4 A

Intensity (mAU)

1 2

3 4 5 6 B

Intensity (mAU)

1

3 4 5 6 C

Intensity (mAU)

Retention time (min)

1 2

3 4 5 6 D