0 -1 -2 -3 -4 -5 -6 -7

Visual threshold (Log I) B

red light

0 -1 -2 -3 -4 -5 -6 -7

Visual threshold (Log I)

A

white light

0 -1 -2 -3 -4 -5 -6 -7

Visual threshold (Log I)

C

Time of day 07

11

15

19

23

03

07

green light

Fig. S3. Circadian rhythms of behavioral visual sensitivity of wild-type zebrafish (n = 12) in white (A), red (B) and green light (C) measured before (circles) and after (squares) metronidazole-treatments. Metronidazole produced no effects on the circadian rhythms of behavioral visual sensitivity. In all the conditions, visual thresholds are low in the afternoon and high in the early morning and night. Horizontal hatched and black bars on the top of the panel represent subjective day and night, respectively.