Embryo Length (μm)

Time t (minutes)

0 100 200 300 400 500

0

100

200 0 50 100 150 200 250 0

100

200 0 100 200 300 400 Production Rate S_{con}

Embryo Length (μm)

0 100 200 300 400 500

0

100

200 0 50 100 150 200 250 0

100

200 0 100 200 300 400 Production Rate S_{con-dec}

Embryo Length (μm)

0 100 200 300 400 500

0

100

200 0 50 100 150 200 250 0

100

200 0 50 100 150 200 Production Rate S_{con-dec}

Embryo Length (μm)

0 100 200 300 400 500

0

100

200 0 50 100 150 200 250 0

100

200 0 50 100 150 200 Production Rate S_{con-dec}

Ai Aii

Bi

Ci

Di

Bii

Cii

Dii