Frequency

-1.0 -0.5 0.0 0.5 1.0

0 20 40 60 80 100 120

D_2

0 2 4 6 8

(a)

-1.0 -0.5 0.0 0.5 1.0

0 20 40 60 80 100 120

D_4

0 2 4 6 8

Correlation betweent_F and t_N �_t

(b)

-1.0 -0.5 0.0 0.5 1.0

0 20 40 60 80 100 120

D_6

0 2 4 6 8 10 12 14

(c)