0.00

0.25

0.50

0.75

1.00

0.00 0.25 0.50 0.75 1.00

1 - Specificity

Sensitivity

T1D All SNPs (AUC=0.69) T1D MHC SNPs (AUC=0.64) T1D Non-MHC SNPs (AUC=0.56)