0 50 100 150 0 5 10 15 20 25

Time lag [ms]

0 50 100 150 80 100 120 140

Power [dB]

0 50 100 150 80 100 120 140

8300 spikes/s 8800 9300 9800 10300 10800 11300

0 50 100 150 0 0.1 0.2 0.3 0.4

Coherence

0 50 100 150 0

0.5

1

Frequency [Hz]

Mutual Information [bits]

Network 1 Network 2

A B

C D

E