Figure S1. RT-PCR assay of splicing mixtures incubated with different ratios of test and control premRNAs. Eighty pM of test 7-AdA(-.-) or 7-AdA (+.+) pre-mRNA was mixed with various amounts of control 7B-Ad pre-mRNA (from 0 to 40 pM). The mixtures were incubated in HeLa nuclear extracts for two hours at 30ßC. The RT-PCR assay was carried out with a single pair of primers that amplify mRNA products derived from all pre-mRNAs. The stimulation provided by ABS can be observed at all ratios of test/control pre-mRNAs.

7-AdA(-.-) 7-AdA(+.+)

7B/Ad (control)

7/Ad

0

40

8

4

0.8

0

40

8

4

0.8 control pre-mRNA (pM)