50

100 τ_{exp} = 5 ms

Cat 1 Performance (% correct) τ_{exp} = 20 ms τ_{exp} = 80 ms

col10d24

50

100

Cat 2 Performance (% correct)

col13a20

0 200 400 600 50

100

Time [ms]

Cat 3 Performance (% correct)

0 200 400 600 Time [ms]

0 200 400 600 Time [ms]

cer01a47

SD of the jitter [ms]

0

20